// Copyright 2020-2022 The Khronos Group Inc.
//
// SPDX-License-Identifier: CC-BY-4.0

// Common Valid Usage
// Common to VkBufferImageCopy* struct
  * [[VUID-{refpage}-bufferRowLength-00195]]
    pname:bufferRowLength must: be `0`, or greater than or equal to the
    pname:width member of pname:imageExtent
  * [[VUID-{refpage}-bufferImageHeight-00196]]
    pname:bufferImageHeight must: be `0`, or greater than or equal to the
    pname:height member of pname:imageExtent
  * [[VUID-{refpage}-aspectMask-00212]]
    The pname:aspectMask member of pname:imageSubresource must: only have a
    single bit set
  * [[VUID-{refpage}-imageExtent-06659]]
    pname:imageExtent.width must: not be 0
  * [[VUID-{refpage}-imageExtent-06660]]
    pname:imageExtent.height must: not be 0
  * [[VUID-{refpage}-imageExtent-06661]]
    pname:imageExtent.depth must: not be 0
// Common Valid Usage
