// Copyright 2018-2024 The Khronos Group Inc.
//
// SPDX-License-Identifier: CC-BY-4.0

include::{generated}/meta/{refprefix}VK_KHR_calibrated_timestamps.adoc[]

=== Other Extension Metadata

*Last Modified Date*::
    2023-07-12
*IP Status*::
    No known IP claims.
*Contributors*::
  - Matthaeus G. Chajdas, AMD
  - Alan Harrison, AMD
  - Derrick Owens, AMD
  - Daniel Rakos, RasterGrid
  - Faith Ekstrand, Intel
  - Keith Packard, Valve

=== Description

This extension provides an interface to query calibrated timestamps obtained
quasi simultaneously from two time domains.

include::{generated}/interfaces/VK_KHR_calibrated_timestamps.adoc[]

=== Version History

  * Revision 1, 2023-07-12 (Daniel Rakos)
  ** Initial draft.
